X-Git-Url: https://svn.cri.ensmp.fr/git/pipstransfo.git/blobdiff_plain/61e96cd04cf67182f81330cfbb76b9b2c5c7b892..625670968322617fed9df3a0ec370faa3185f167:/pipstransfo.tex?ds=inline

diff --git a/pipstransfo.tex b/pipstransfo.tex
index 4cef713..4706900 100644
--- a/pipstransfo.tex
+++ b/pipstransfo.tex
@@ -3,12 +3,13 @@
 \usepackage[utf8]{inputenc}
 \usepackage[T1]{fontenc}
 \usepackage[english]{babel}
+\usepackage{lmodern}
 
 \usepackage{listings}
 \usepackage{hyperref}
 
 
-\title{PIPS - List of code transformations}
+\title{PIPS~--- List of code transformations}
 
 
 
@@ -115,8 +116,7 @@
   are private to a loop body, i.e.\ written first, then read.}
 
 \item[loop normalization]{is a loop transformation that changes
-  the loop initial increment value or the loop range to enforce certain values, generally
-  1.}
+  the loop initial increment value or the loop range to enforce certain values, generally~1.}
 
 \item[iteration clamping]{is a loop transformation that extends
   the loop range but guards the loop body with the former range.}
